-- pluginconfignew.plu_func_type definition

CREATE TABLE `plu_func_type` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `value` varchar(50) NOT NULL DEFAULT '' COMMENT '名称',
  `url` varchar(250) NOT NULL DEFAULT '' COMMENT '平台链接',
  `is_enable` int(2) NOT NULL DEFAULT '0' COMMENT '是否启用',
  `sort` int(11) NOT NULL DEFAULT '0' COMMENT '排序',
  `create_time` TIMESTAMP NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `last_modify_time` TIMESTAMP NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '最后更新时间' ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=8 DEFAULT CHARSET=utf8mb4  COMMENT='功能类别表'



-- pluginconfignew.plu_version definition

CREATE TABLE `plu_version` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `plugVersion` varchar(50) NOT NULL DEFAULT '' COMMENT '插件版本',
  `plugUpdateDate` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '更新日期',
  `downUrl` varchar(200) NOT NULL DEFAULT '' COMMENT '下载地址',
  `helpUrl` varchar(200) NOT NULL DEFAULT '' COMMENT '帮助文档地址',
  `description` json DEFAULT NULL  COMMENT '更新说明',
  `is_enable` int(2) NOT NULL DEFAULT '0' COMMENT '是否启用',
  `create_time` TIMESTAMP NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `last_modify_time` TIMESTAMP NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '最后更新时间' ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=8 DEFAULT CHARSET=utf8mb4 COMMENT='插件版本表';




