-- dm_tools.usr_reply definition

CREATE TABLE `usr_reply` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `user_id` int(11) unsigned DEFAULT '0' COMMENT '用户id',
  `feedback_id` int(11) unsigned DEFAULT '0' COMMENT '问题id',
  `nick_name` varchar(50) NOT NULL COMMENT '用户昵称',
  `context` json NOT NULL COMMENT '内容',
  `pictureList` json NOT NULL COMMENT '图片列表',
  `likes` int(11) NOT NULL DEFAULT '0' COMMENT '点赞数',
  `is_delete` int(1) NOT NULL DEFAULT '0' COMMENT '是否删除',
  `create_time` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `last_modify_time` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '最后更新时间' ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=21 DEFAULT CHARSET=utf8mb4 COMMENT='用户反馈回复表';




-- dm_tools.usr_feedback definition

CREATE TABLE `usr_feedback` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `user_id` int(11) unsigned DEFAULT '0' COMMENT '用户id',
  `nick_name` varchar(100) NOT NULL DEFAULT '' COMMENT '昵称',
  `problem_type` varchar(100) NOT NULL DEFAULT '页面优化建议' COMMENT '问题类别',
  `context` json NOT NULL COMMENT '内容',
  `mail_box` varchar(100) NOT NULL DEFAULT '' COMMENT '邮箱',
  `pictureList` json NOT NULL COMMENT '图片列表',
  `likes` int(11) NOT NULL DEFAULT '0' COMMENT '点赞数',
  `is_top` int(1) NOT NULL DEFAULT '0' COMMENT '是否置顶',
  `is_comments` int(1) NOT NULL DEFAULT '0' COMMENT '是否关闭评论',
  `is_delete` int(1) NOT NULL DEFAULT '0' COMMENT '是否删除',
  `create_time` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `last_modify_time` timestamp NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '最后更新时间' ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=23 DEFAULT CHARSET=utf8mb4 COMMENT='用户反馈表';